use dcp;
UPDATE `dcp`.`sys_parameter` SET  `PARAMETER_VALUE` = '823490',  `UPDATE_USER_ID` = 1, `UPDATE_TIME` = '2020-12-29 11:02:24' WHERE `PARAMETER_ID` = 175;
/*已操作161,159*/