use `dcp`;

DROP TABLE IF EXISTS `url_watch`;
CREATE TABLE `url_watch` (
  `id` varchar(64) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '主键id',
  `request_url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '被监测的url',
  `params` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '具体检测信息',
  `ip_addr` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求ip地址',
  `type` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '日志类型',
  `level` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '日志等级',
  `methods` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求方法',
  `status` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求成功与否（exception是否有值）',
  `project` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求内容',
  `create_by` varchar(64) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '创建人',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '更新人',
  `update_date` datetime DEFAULT NULL COMMENT '更新时间',
  `message1` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '信息1',
  `message2` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '信息2',
  `message3` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '信息3',
  `message4` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '信息4',
  `message5` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '信息5',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;

DROP TABLE IF EXISTS `url_watch_data`;
CREATE TABLE `url_watch_data` (
  `id` varchar(64) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '主键id',
  `watch_id` varchar(64) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '监测url的id',
  `url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '监控url',
  `params_result` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT 'url内容解析出来的结果',
  `result` longtext COLLATE utf8mb4_unicode_ci COMMENT 'result结果',
  `ip_addr` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT 'ip地址',
  `type` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '日志类型',
  `level` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '日志等级',
  `methods` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求方法',
  `status` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '请求成功与否（exception是否有值）',
  `operate_object` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '操作对象',
  `exception` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '异常信息',
  `time` varchar(100) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '访问时间',
  `create_by` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '创建人',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '更新人',
  `update_date` datetime DEFAULT NULL COMMENT '更新时间',
  `backup_one` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '备份字段1',
  `backup_two` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '备份字段2',
  `backup_three` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '备份字段3',
  `backup_four` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '备份字段4',
  `backup_five` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '备份字段5',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;
/*161  159已执行  2020.1.27 */
